<template>
    <view class="container-box">
        <image src="/static/image/bmi/manual_icon_arrow.png" alt="" class="back-class" @click="goBcak()"></image>
        <view class="info-box">
            <view class="student-card">
                <view class="student-box1">
                    <image class="head-img" src="/static/image/bmi/test_img_head_gril.png">
                    </image>
                    <view class="student-info1">
                        <view class="student-info11">
                            <view class="student-info111">
                                <view>张珊珊</view>
                                <image class="sex-img" src="/static/image/bmi/test_icon_gril.png"></image>
                            </view>
                            <view class="student-num">编号：1212456</view>
                        </view>
                        <view class="student-info12">一年3班</view>
                    </view>
                </view>
                <view class="student-info2">
                    <view>
                        <image src="/static/image/bmi/test_icon_id.png">
                        </image>
                        <text>11122221</text>
                    </view>
                    <view>
                        <image src="/static/image/bmi/test_icon_school.png">
                        </image>
                        <text>石岐小学</text>
                    </view>
                </view>
            </view>
            <view class="">
                <view class="adron-box">
                    <image src="/static/image/bmi/test_img_adron.png" alt="" class="adron" @click="goBcak()">
                    </image>
                    <image src="/static/image/bmi/test_img_adron.png" alt="" class="adron" @click="goBcak()">
                    </image>
                </view>
                <view class="bmi-info">
                    <view class="bmi-title">测量结果展示</view>
                </view>
            </view>
        </view>
        <view class="btn-box">
            <view class="btn1">重新检测</view>
            <view class="btn2">完成</view>
        </view>
    </view>
</template>

<script>
import { navTo, showToast } from "@/utils/app";

export default {
    name: "bmi",
    methods: {
        goBcak() {
            navTo('pages/classes/select', {

            })
        },
    }
}
</script>

<style scoped>
.container-box {
    height: 100vh;
    width: 100%;
    background: linear-gradient(to bottom left, rgb(218, 233, 253), #fff, rgb(218, 233, 253));
    position: relative;
    overflow: auto;
}

.back-class {
    position: absolute;
    top: 40upx;
    left: 46upx;
    width: 70upx;
    height: 70upx;
}

.info-box {
    margin: 75upx auto 0;
    width: 680upx;
}

.student-card {
    width: 680upx;
    height: 28vh;
    padding: 3vh 30upx ;
    background: #F1F7FF;
    box-shadow: 0upx 5upx 5upx 0upx rgba(12, 88, 183, 0.35);
    border-radius: 28upx;
    border: 4upx solid #FFFFFF;
    box-sizing: border-box;
}

.student-box1{
    width: 600upx;
    height: 14vh;
    display: flex;
}
.student-info1{
    flex: 1;
    padding: 20upx 0 20upx 20upx;
}
.student-info11{
    display: flex;
    justify-content: space-between;
    width: 100%;
}
.student-info111{
    display: flex;
    justify-content: space-between;
}
.student-info111 view{
    font-weight: bold;
font-size: 35rpx;
color: #2F3C42;
}
.student-num{
    width: 168upx;
height: 45upx;
line-height: 45upx;
background: #E2EBFF;
border-radius: 28upx;
font-weight: 400;
font-size: 21rpx;
color: #0369E8;
text-align: center;
}
.student-info12{
    font-size: 21upx;
color: #0369E8;
}
.head-img{
    width: 125upx;
    height: 125upx;
    border-radius: 50%;
    border: #E2EBFF solid 5upx;
}
.sex-img{
    width: 37.5upx;
    height: 37.5upx;
    border-radius: 50%; 
}
.student-info2{
    width: 100%;
    height: 108upx;
    display: flex;
    justify-content: space-between;

}
.student-info2 view{
    width: 290upx;
    background: #E2EBFF;
    border-radius: 28upx;
    height: 108upx;
    display: flex;
    padding:20upx 25upx;
    box-sizing: border-box;
}
.student-info2 image{
    width: 68upx;
    height: 68upx;
}
.student-info2 text{
    font-weight: bold;
font-size: 21rpx;
color: #0369E8;
line-height: 7vh;
}
.bmi-info {
    width: 100%;
    height: 50vh;
    background: #FFFFFF;
    border-radius: 28upx;
}

.bmi-title {
    width: 100%;
    height: 106upx;
    line-height: 106upx;
    font-weight: bold;
    font-size: 35upx;
    text-align: center;
    color: #FFFFFF;
    background: #0369E8;
    border-radius: 28upx;
}

.adron-box {
    display: flex;
    justify-content: space-between;
    position: relative;
    top: -10upx;
}

.adron {
    width: 20upx;
    height: 60upx;
    margin: 0 80upx -30upx;
}

.btn-box{
    display: flex;
    justify-content: space-between;

    width: 680upx;
    margin: 20upx auto 0;
}
.btn1{
    width: 305upx;
height: 97upx;
line-height: 97upx;
background: #F1F7FF;
border-radius: 21upx;
border: 3upx solid #0369E8;
font-weight: bold;
font-size: 35rpx;
color: #0369E8;
text-align: center;
}
.btn2{
    width: 305upx;
height: 97upx;
line-height: 97upx;
background: #0369E8;
border-radius: 21upx;
font-weight: bold;
font-size: 35rpx;
color: #FFFFFF;
text-align: center;
}
</style>